en	Winding path 2

en	Light all %%icon icon-bonfire$%% bonfires %%icon mdi mdi-alert-octagon-outline$%%Warning: all the heroes must survive %%icon mdi mdi-information-outline$%% copy/paste the code from the previous level to go faster